{"system": {"os_family": "Debian", "architecture": "x86_64", "distribution": "Debian", "distribution_version": "12.0", "distribution_release": "bookworm"}, "services": {"1panel.service": {"name": "1panel.service", "source": "systemd", "state": "running", "status": "enabled"}, "NetworkManager.service": {"name": "NetworkManager.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "acpid": {"name": "acpid", "source": "sysv", "state": "running"}, "acpid.service": {"name": "acpid.service", "source": "systemd", "state": "running", "status": "enabled"}, "apparmor": {"name": "apparmor", "source": "sysv", "state": "running"}, "apparmor.service": {"name": "apparmor.service", "source": "systemd", "state": "stopped", "status": "enabled"}, "apt-daily-upgrade.service": {"name": "apt-daily-upgrade.service", "source": "systemd", "state": "stopped", "status": "static"}, "apt-daily.service": {"name": "apt-daily.service", "source": "systemd", "state": "stopped", "status": "static"}, "auditd.service": {"name": "auditd.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "autovt@.service": {"name": "autovt@.service", "source": "systemd", "state": "unknown", "status": "alias"}, "connman.service": {"name": "connman.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "console-getty.service": {"name": "console-getty.service", "source": "systemd", "state": "inactive", "status": "disabled"}, "console-screen.service": {"name": "console-screen.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "console-setup.service": {"name": "console-setup.service", "source": "systemd", "state": "stopped", "status": "enabled"}, "console-setup.sh": {"name": "console-setup.sh", "source": "sysv", "state": "stopped"}, "container-getty@.service": {"name": "container-getty@.service", "source": "systemd", "state": "unknown", "status": "static"}, "containerd.service": {"name": "containerd.service", "source": "systemd", "state": "running", "status": "enabled"}, "cron": {"name": "cron", "source": "sysv", "state": "running"}, "cron.service": {"name": "cron.service", "source": "systemd", "state": "running", "status": "enabled"}, "cryptdisks-early.service": {"name": "cryptdisks-early.service", "source": "systemd", "state": "inactive", "status": "masked"}, "cryptdisks.service": {"name": "cryptdisks.service", "source": "systemd", "state": "inactive", "status": "masked"}, "dbus": {"name": "dbus", "source": "sysv", "state": "running"}, "dbus-org.freedesktop.hostname1.service": {"name": "dbus-org.freedesktop.hostname1.service", "source": "systemd", "state": "inactive", "status": "alias"}, "dbus-org.freedesktop.locale1.service": {"name": "dbus-org.freedesktop.locale1.service", "source": "systemd", "state": "inactive", "status": "alias"}, "dbus-org.freedesktop.login1.service": {"name": "dbus-org.freedesktop.login1.service", "source": "systemd", "state": "active", "status": "alias"}, "dbus-org.freedesktop.timedate1.service": {"name": "dbus-org.freedesktop.timedate1.service", "source": "systemd", "state": "inactive", "status": "alias"}, "dbus-org.freedesktop.timesync1.service": {"name": "dbus-org.freedesktop.timesync1.service", "source": "systemd", "state": "active", "status": "alias"}, "dbus.service": {"name": "dbus.service", "source": "systemd", "state": "running", "status": "static"}, "debug-shell.service": {"name": "debug-shell.service", "source": "systemd", "state": "inactive", "status": "disabled"}, "display-manager.service": {"name": "display-manager.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "docker": {"name": "docker", "source": "sysv", "state": "running"}, "docker.service": {"name": "docker.service", "source": "systemd", "state": "running", "status": "enabled"}, "dpkg-db-backup.service": {"name": "dpkg-db-backup.service", "source": "systemd", "state": "stopped", "status": "static"}, "e2scrub@.service": {"name": "e2scrub@.service", "source": "systemd", "state": "unknown", "status": "static"}, "e2scrub_all.service": {"name": "e2scrub_all.service", "source": "systemd", "state": "stopped", "status": "static"}, "e2scrub_fail@.service": {"name": "e2scrub_fail@.service", "source": "systemd", "state": "unknown", "status": "static"}, "e2scrub_reap.service": {"name": "e2scrub_reap.service", "source": "systemd", "state": "stopped", "status": "enabled"}, "emergency.service": {"name": "emergency.service", "source": "systemd", "state": "stopped", "status": "static"}, "fail2ban": {"name": "fail2ban", "source": "sysv", "state": "stopped"}, "fail2ban.service": {"name": "fail2ban.service", "source": "systemd", "state": "stopped", "status": "failed"}, "firewalld.service": {"name": "firewalld.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "fstrim.service": {"name": "fstrim.service", "source": "systemd", "state": "stopped", "status": "static"}, "getty-static.service": {"name": "getty-static.service", "source": "systemd", "state": "stopped", "status": "static"}, "getty@.service": {"name": "getty@.service", "source": "systemd", "state": "unknown", "status": "enabled"}, "getty@tty1.service": {"name": "getty@tty1.service", "source": "systemd", "state": "running", "status": "active"}, "guestfs-firstboot": {"name": "guestfs-firstboot", "source": "sysv", "state": "running"}, "guestfs-firstboot.service": {"name": "guestfs-firstboot.service", "source": "systemd", "state": "stopped", "status": "enabled"}, "gwarp": {"name": "gwarp", "source": "sysv", "state": "stopped"}, "gwarp.service": {"name": "gwarp.service", "source": "systemd", "state": "stopped", "status": "generated"}, "haveged": {"name": "haveged", "source": "sysv", "state": "running"}, "haveged.service": {"name": "haveged.service", "source": "systemd", "state": "running", "status": "enabled"}, "http-server.service": {"name": "http-server.service", "source": "systemd", "state": "running", "status": "enabled"}, "hwclock.service": {"name": "hwclock.service", "source": "systemd", "state": "inactive", "status": "masked"}, "hwclock.sh": {"name": "hwclock.sh", "source": "sysv", "state": "stopped"}, "ifup@.service": {"name": "ifup@.service", "source": "systemd", "state": "unknown", "status": "static"}, "ifupdown-pre.service": {"name": "ifupdown-pre.service", "source": "systemd", "state": "stopped", "status": "static"}, "ifupdown-wait-online.service": {"name": "ifupdown-wait-online.service", "source": "systemd", "state": "inactive", "status": "disabled"}, "initrd-cleanup.service": {"name": "initrd-cleanup.service", "source": "systemd", "state": "stopped", "status": "static"}, "initrd-parse-etc.service": {"name": "initrd-parse-etc.service", "source": "systemd", "state": "stopped", "status": "static"}, "initrd-switch-root.service": {"name": "initrd-switch-root.service", "source": "systemd", "state": "stopped", "status": "static"}, "initrd-udevadm-cleanup-db.service": {"name": "initrd-udevadm-cleanup-db.service", "source": "systemd", "state": "stopped", "status": "static"}, "ip6tables.service": {"name": "ip6tables.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "ipset.service": {"name": "ipset.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "iptables.service": {"name": "iptables.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "ipv6net": {"name": "ipv6net", "source": "sysv", "state": "stopped"}, "ipv6net.service": {"name": "ipv6net.service", "source": "systemd", "state": "stopped", "status": "generated"}, "kbd.service": {"name": "kbd.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "keyboard-setup.service": {"name": "keyboard-setup.service", "source": "systemd", "state": "stopped", "status": "enabled"}, "keyboard-setup.sh": {"name": "keyboard-setup.sh", "source": "sysv", "state": "stopped"}, "kmod": {"name": "kmod", "source": "sysv", "state": "running"}, "kmod-static-nodes.service": {"name": "kmod-static-nodes.service", "source": "systemd", "state": "stopped", "status": "static"}, "kmod.service": {"name": "kmod.service", "source": "systemd", "state": "active", "status": "alias"}, "komari-agent.service": {"name": "komari-agent.service", "source": "systemd", "state": "running", "status": "enabled"}, "komari.service": {"name": "komari.service", "source": "systemd", "state": "running", "status": "enabled"}, "logrotate.service": {"name": "logrotate.service", "source": "systemd", "state": "stopped", "status": "static"}, "man-db.service": {"name": "man-db.service", "source": "systemd", "state": "stopped", "status": "static"}, "modprobe@.service": {"name": "modprobe@.service", "source": "systemd", "state": "unknown", "status": "static"}, "modprobe@configfs.service": {"name": "modprobe@configfs.service", "source": "systemd", "state": "stopped", "status": "inactive"}, "modprobe@dm_mod.service": {"name": "modprobe@dm_mod.service", "source": "systemd", "state": "stopped", "status": "inactive"}, "modprobe@drm.service": {"name": "modprobe@drm.service", "source": "systemd", "state": "stopped", "status": "inactive"}, "modprobe@efi_pstore.service": {"name": "modprobe@efi_pstore.service", "source": "systemd", "state": "stopped", "status": "inactive"}, "modprobe@fuse.service": {"name": "modprobe@fuse.service", "source": "systemd", "state": "stopped", "status": "inactive"}, "modprobe@loop.service": {"name": "modprobe@loop.service", "source": "systemd", "state": "stopped", "status": "inactive"}, "networking": {"name": "networking", "source": "sysv", "state": "running"}, "networking.service": {"name": "networking.service", "source": "systemd", "state": "stopped", "status": "enabled"}, "nftables.service": {"name": "nftables.service", "source": "systemd", "state": "stopped", "status": "disabled"}, "pam_namespace.service": {"name": "pam_namespace.service", "source": "systemd", "state": "inactive", "status": "static"}, "phpsessionclean.service": {"name": "phpsessionclean.service", "source": "systemd", "state": "stopped", "status": "static"}, "plymouth-quit-wait.service": {"name": "plymouth-quit-wait.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "plymouth-start.service": {"name": "plymouth-start.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "prefdm.service": {"name": "prefdm.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "procps": {"name": "procps", "source": "sysv", "state": "running"}, "procps.service": {"name": "procps.service", "source": "systemd", "state": "active", "status": "alias"}, "qemu-guest-agent": {"name": "qemu-guest-agent", "source": "sysv", "state": "running"}, "qemu-guest-agent.service": {"name": "qemu-guest-agent.service", "source": "systemd", "state": "running", "status": "static"}, "qemukvmga": {"name": "qemukvmga", "source": "sysv", "state": "stopped"}, "qemukvmga.service": {"name": "qemukvmga.service", "source": "systemd", "state": "running", "status": "generated"}, "quotaon.service": {"name": "quotaon.service", "source": "systemd", "state": "inactive", "status": "static"}, "rc-local.service": {"name": "rc-local.service", "source": "systemd", "state": "stopped", "status": "enabled-runtime"}, "rc.service": {"name": "rc.service", "source": "systemd", "state": "inactive", "status": "masked"}, "rcS.service": {"name": "rcS.service", "source": "systemd", "state": "inactive", "status": "masked"}, "rescue.service": {"name": "rescue.service", "source": "systemd", "state": "stopped", "status": "static"}, "rsyslog.service": {"name": "rsyslog.service", "source": "systemd", "state": "running", "status": "enabled"}, "s-ui.service": {"name": "s-ui.service", "source": "systemd", "state": "running", "status": "enabled"}, "serial-getty@.service": {"name": "serial-getty@.service", "source": "systemd", "state": "unknown", "status": "indirect"}, "serial-getty@ttyS0.service": {"name": "serial-getty@ttyS0.service", "source": "systemd", "state": "running", "status": "active"}, "sing-box.service": {"name": "sing-box.service", "source": "systemd", "state": "running", "status": "enabled"}, "sing-box@.service": {"name": "sing-box@.service", "source": "systemd", "state": "unknown", "status": "disabled"}, "ssh": {"name": "ssh", "source": "sysv", "state": "running"}, "ssh.service": {"name": "ssh.service", "source": "systemd", "state": "running", "status": "enabled"}, "sshd.service": {"name": "sshd.service", "source": "systemd", "state": "active", "status": "alias"}, "sub.service": {"name": "sub.service", "source": "systemd", "state": "running", "status": "enabled"}, "sudo": {"name": "sudo", "source": "sysv", "state": "stopped"}, "sudo.service": {"name": "sudo.service", "source": "systemd", "state": "inactive", "status": "masked"}, "syslog.service": {"name": "syslog.service", "source": "systemd", "state": "active", "status": "alias"}, "system-update-cleanup.service": {"name": "system-update-cleanup.service", "source": "systemd", "state": "inactive", "status": "static"}, "systemd-ask-password-console.service": {"name": "systemd-ask-password-console.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-ask-password-wall.service": {"name": "systemd-ask-password-wall.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-backlight@.service": {"name": "systemd-backlight@.service", "source": "systemd", "state": "unknown", "status": "static"}, "systemd-binfmt.service": {"name": "systemd-binfmt.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-boot-check-no-failures.service": {"name": "systemd-boot-check-no-failures.service", "source": "systemd", "state": "inactive", "status": "disabled"}, "systemd-exit.service": {"name": "systemd-exit.service", "source": "systemd", "state": "inactive", "status": "static"}, "systemd-firstboot.service": {"name": "systemd-firstboot.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-fsck-root.service": {"name": "systemd-fsck-root.service", "source": "systemd", "state": "stopped", "status": "enabled-runtime"}, "systemd-fsck@.service": {"name": "systemd-fsck@.service", "source": "systemd", "state": "unknown", "status": "static"}, "systemd-fsck@dev-disk-by\\x2duuid-8defcd09\\x2d6511\\x2d4fc6\\x2dbad6\\x2da5a90521b7ad.service": {"name": "systemd-fsck@dev-disk-by\\x2duuid-8defcd09\\x2d6511\\x2d4fc6\\x2dbad6\\x2da5a90521b7ad.service", "source": "systemd", "state": "stopped", "status": "active"}, "systemd-fsckd.service": {"name": "systemd-fsckd.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-halt.service": {"name": "systemd-halt.service", "source": "systemd", "state": "inactive", "status": "static"}, "systemd-hibernate-resume@.service": {"name": "systemd-hibernate-resume@.service", "source": "systemd", "state": "unknown", "status": "static"}, "systemd-hibernate.service": {"name": "systemd-hibernate.service", "source": "systemd", "state": "inactive", "status": "static"}, "systemd-hostnamed.service": {"name": "systemd-hostnamed.service", "source": "systemd", "state": "inactive", "status": "static"}, "systemd-hwdb-update.service": {"name": "systemd-hwdb-update.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "systemd-hybrid-sleep.service": {"name": "systemd-hybrid-sleep.service", "source": "systemd", "state": "inactive", "status": "static"}, "systemd-initctl.service": {"name": "systemd-initctl.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-journal-flush.service": {"name": "systemd-journal-flush.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-journald.service": {"name": "systemd-journald.service", "source": "systemd", "state": "running", "status": "static"}, "systemd-journald@.service": {"name": "systemd-journald@.service", "source": "systemd", "state": "unknown", "status": "static"}, "systemd-kexec.service": {"name": "systemd-kexec.service", "source": "systemd", "state": "inactive", "status": "static"}, "systemd-localed.service": {"name": "systemd-localed.service", "source": "systemd", "state": "inactive", "status": "static"}, "systemd-logind.service": {"name": "systemd-logind.service", "source": "systemd", "state": "running", "status": "static"}, "systemd-machine-id-commit.service": {"name": "systemd-machine-id-commit.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-modules-load.service": {"name": "systemd-modules-load.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-network-generator.service": {"name": "systemd-network-generator.service", "source": "systemd", "state": "inactive", "status": "disabled"}, "systemd-networkd-wait-online.service": {"name": "systemd-networkd-wait-online.service", "source": "systemd", "state": "inactive", "status": "disabled"}, "systemd-networkd-wait-online@.service": {"name": "systemd-networkd-wait-online@.service", "source": "systemd", "state": "unknown", "status": "disabled"}, "systemd-networkd.service": {"name": "systemd-networkd.service", "source": "systemd", "state": "stopped", "status": "disabled"}, "systemd-pcrphase-initrd.service": {"name": "systemd-pcrphase-initrd.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-pcrphase-sysinit.service": {"name": "systemd-pcrphase-sysinit.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-pcrphase.service": {"name": "systemd-pcrphase.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-poweroff.service": {"name": "systemd-poweroff.service", "source": "systemd", "state": "inactive", "status": "static"}, "systemd-pstore.service": {"name": "systemd-pstore.service", "source": "systemd", "state": "stopped", "status": "enabled"}, "systemd-quotacheck.service": {"name": "systemd-quotacheck.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-random-seed.service": {"name": "systemd-random-seed.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-reboot.service": {"name": "systemd-reboot.service", "source": "systemd", "state": "inactive", "status": "static"}, "systemd-remount-fs.service": {"name": "systemd-remount-fs.service", "source": "systemd", "state": "stopped", "status": "enabled-runtime"}, "systemd-repart.service": {"name": "systemd-repart.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-rfkill.service": {"name": "systemd-rfkill.service", "source": "systemd", "state": "inactive", "status": "static"}, "systemd-suspend-then-hibernate.service": {"name": "systemd-suspend-then-hibernate.service", "source": "systemd", "state": "inactive", "status": "static"}, "systemd-suspend.service": {"name": "systemd-suspend.service", "source": "systemd", "state": "inactive", "status": "static"}, "systemd-sysctl.service": {"name": "systemd-sysctl.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-sysext.service": {"name": "systemd-sysext.service", "source": "systemd", "state": "stopped", "status": "disabled"}, "systemd-sysusers.service": {"name": "systemd-sysusers.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-time-wait-sync.service": {"name": "systemd-time-wait-sync.service", "source": "systemd", "state": "inactive", "status": "disabled"}, "systemd-timedated.service": {"name": "systemd-timedated.service", "source": "systemd", "state": "inactive", "status": "static"}, "systemd-timesyncd.service": {"name": "systemd-timesyncd.service", "source": "systemd", "state": "running", "status": "enabled"}, "systemd-tmpfiles-clean.service": {"name": "systemd-tmpfiles-clean.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-tmpfiles-setup-dev.service": {"name": "systemd-tmpfiles-setup-dev.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-tmpfiles-setup.service": {"name": "systemd-tmpfiles-setup.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-tmpfiles.service": {"name": "systemd-tmpfiles.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "systemd-udev-settle.service": {"name": "systemd-udev-settle.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-udev-trigger.service": {"name": "systemd-udev-trigger.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-udevd.service": {"name": "systemd-udevd.service", "source": "systemd", "state": "running", "status": "static"}, "systemd-update-done.service": {"name": "systemd-update-done.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "systemd-update-utmp-runlevel.service": {"name": "systemd-update-utmp-runlevel.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-update-utmp.service": {"name": "systemd-update-utmp.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-user-sessions.service": {"name": "systemd-user-sessions.service", "source": "systemd", "state": "stopped", "status": "static"}, "systemd-vconsole-setup.service": {"name": "systemd-vconsole-setup.service", "source": "systemd", "state": "stopped", "status": "not-found"}, "systemd-volatile-root.service": {"name": "systemd-volatile-root.service", "source": "systemd", "state": "inactive", "status": "static"}, "udev": {"name": "udev", "source": "sysv", "state": "running"}, "udev.service": {"name": "udev.service", "source": "systemd", "state": "active", "status": "alias"}, "ufw": {"name": "ufw", "source": "sysv", "state": "stopped"}, "ufw.service": {"name": "ufw.service", "source": "systemd", "state": "inactive", "status": "disabled"}, "user-runtime-dir@.service": {"name": "user-runtime-dir@.service", "source": "systemd", "state": "unknown", "status": "static"}, "user-runtime-dir@0.service": {"name": "user-runtime-dir@0.service", "source": "systemd", "state": "stopped", "status": "active"}, "user@.service": {"name": "user@.service", "source": "systemd", "state": "unknown", "status": "static"}, "user@0.service": {"name": "user@0.service", "source": "systemd", "state": "running", "status": "active"}, "v2ray.service": {"name": "v2ray.service", "source": "systemd", "state": "running", "status": "enabled"}, "vnstat": {"name": "vnstat", "source": "sysv", "state": "running"}, "vnstat.service": {"name": "vnstat.service", "source": "systemd", "state": "running", "status": "enabled"}, "warp-svc.service": {"name": "warp-svc.service", "source": "systemd", "state": "running", "status": "enabled"}, "x11-common": {"name": "x11-common", "source": "sysv", "state": "stopped"}, "x11-common.service": {"name": "x11-common.service", "source": "systemd", "state": "inactive", "status": "masked"}}, "init": "2b40391be44a4566e97f2727a4252165"}